Construction Technologies and Architecture, ISSN: 2674-1237, Vol. 16, pp -3-0

© 2025 Trans Tech Publications Ltd, All Rights Reserved

Accepted:
2025-03-04

Online:
2025-03-18

Preface

The original version of this paper is available on https://www.scientific.net/CTA.16.-3.pdf

This edition is a compilation of research papers presented at the 1st International Conference on Research in Engineering and Science Technology (IC-REST), held on October 10, 2023, at the Faculty of Engineering Campus, Universitas Hasanuddin, Gowa, Indonesia.

The conference is an annual event hosted by the Faculty of Engineering, Universitas Hasanuddin. This meeting focused on "Advanced Technologies to Fulfill SDGs for Sustainable Life" and served as a platform for exchanging knowledge, experiences, and best practices that transcend borders and disciplines of many scientific fields.

The publication showcases the latest research results and innovative solutions in the area of construction and architecture, highlighting their potential to address global challenges and contribute to a sustainable future. This edition is a valuable resource for researchers, academics, and industry professionals interested in exploring the intersection of engineering practice, science, and sustainable development.

Committee

The original version of this paper is available on https://www.scientific.net/CTA.16.-3.pdf

Advisory Committee

The original version of this paper is available on https://www.scientific.net/CTA.16.-3.pdf

Prof. Dr. Eng. Ir. Muhammad Isran Ramli, S.T., M.T., IPM., ASEAN. Eng.
Dr. Amil Ahmad Ilham, S.T., M.IT.
Dr. Eng. Muhammad Rusman, S.T., M.T., IPM
Dr. Ir. Rustan Tarakka, S.T., M.T.
Dr. Eng. Ir. Muhammad Ramli, M.T.
Dr. Eng. Achmad Yasir Baeda, S.T., M.T.
Dr. Eng. Muhammad Akbar Caronge, S.T., M.T.
Ir. Abdul Mufti Radja, S.T., M.T., Ph.D.
Ir. Azwar Hayat, S.T., M.Sc., Ph.D.
Prof. Dr. Eng. Suandar Baso, S.T., M.T.
Dr. Eng. Hendra Pachri, S.T., M.Eng.
Dr. Aryanti Virtanti Anas, S.T., M.T.
Dr. Edward Syarif, S.T., M.T.
Prof. Dr. Indrabayu, S.T., M.T., M, Bus. Sys.
Prof. Dr. M. Wihardi Tjaronge, S.T., M.Eng.
Dr. Eng. Muralia Hustim, S.T., M.T.
Prof. Dr. Eng. Jalaluddin, S.T., M.T.
Kifayah Amar, S.T., M.Sc., Ph.D.
Dr. Eng. Faisal Mahmuddin, S.T., M. Inf. Tech., M.Eng.
Dr. Chairul Paotonan, S.T., M.T.
Dr. Eng. Ir. Dewiani, M.T.
Dr. Eng. Ir. Ilham Bakri, S.T., M.Sc., IPM.
Dr. Hairul Arsyad, S.T., M.T.

Organizing Committee

The original version of this paper is available on https://www.scientific.net/CTA.16.-3.pdf

Dr. Eng. Andi Amijoyo Mochtar, S.T., M.Sc. (Chairman)
Fadhil Rizki Clausthaldi, S.T., B.Eng., M.Sc.
Zarah Arwieny Hanami, S.T., M.T.
Annisa Dwi Damayanti, S.T., M.T.
Andi Lolo Sinrang Arisaputra, S.T., M.Eng., Ph.D.
Hardianti Alimuddin, S.T., M.Eng.
Jayanti Mandasari Andi Munawarah Abduh, S.T., M.Eng.
Rosmawati, S. Sos.
A. Ayu Andini, S.Pd.

Dian P, S.IP.
Dr. Eng. Novriany Amalia, S.T., M.T.
Sahabuddin, S.T., M.Eng
Susanti, S. Sos.
Dirham, S.Pd.
Juliana, A.Md.
Ir. Diniary Ikasari, S.T., M.T.
Ir. Rizki Amalia S.T., M.T.
Ir. Megasari Kurnia, S.T., M.T.
Dra. Rakhmawita, M.M.
Supriani, S.T.
Mansur, S. Sos.
Muhammad Alief Fahdal Imran Oemar, S.T., M.Sc.

Tyanita Puti Marindah Wardhani S.T., M.Inf.
Sukono
Syamsuddin
Gafar Lakatupa, S.T., M.Eng.
Gerard Antonini Duma, S.T., M.T.
Rudi, S.T., M.T.
Baharuddin, S.E.
Kaharuddin, S.H.
Janu Adwiyanto, S.T.
Muchlis
Dr. Ing. Venny Veronica Natalia, S.T., M.T.
Fuad Mahfud Assidiq S.T., M.T.
Balqis Shintarahayu, S.T., M.Sc.
Sangkala, S.E., M.M.
Anzar, S.E.

International Scientific Committee

The original version of this paper is available on https://www.scientific.net/CTA.16.-3.pdf

Febriany Eddy (PT. Vale, Indonesia)
Prof. Sathosi Muraki (Kyushu University, Japan)
Prof. Muhammad Zaly Shah (Universiti Teknologi Malaysia, Malaysia)
Prof. Tawatchai Charinpanitkul (Chulalongkorn University, Thailand)
Prof. Ya-Fen Wang (Chung Yuan Christian University, Taiwan)
Dr. Eng. Gde Pandhe Wisnu Suyantara (Kyushu University, Japan)
Prof. Dr. Eng. Daeng Paroka, S.T., M.T., Ph.D. (Faculty of Engineering, Hasanuddin University, Indonesia)
Prof. Dr. Eng. Daeng Paroka, S.T., M.T., Ph.D. (Faculty of Engineering, Hasanuddin University, Indonesia)
Prof. Andi Haris Muhammad, S.T., M.T., Ph.D. (Faculty of Engineering, Hasanuddin University, Indonesia)
Prof. Dr. Tri Harianto, S.T., M.T. (Faculty of Engineering, Hasanuddin University, Indonesia)
Prof. Dr. Eng. Andi Erwin Eka Putra, S.T., M.T. (Faculty of Engineering, Hasanuddin University, Indonesia
Prof. Dr. Ing. Faizal Arya Saman, S.T., M.T. (Faculty of Engineering, Hasanuddin University, Indonesia)
Prof. Dr. Eng. Asri Jaya H.S., S.T., M.T. (Faculty of Engineering, Hasanuddin University, Indonesia) Dr. Eng. Purwanto, S.T., M.T. (Faculty of Engineering, Hasanuddin University, Indonesia)
Dr. Eng. Zulkifli Tahir, S.T., M.Sc. (Faculty of Engineering, Hasanuddin University, Indonesia)
Marly Valenti Patandianan, S.T., M.T. (Faculty of Engineering, Hasanuddin University, Indonesia)
Prof. Dr. Ir. Triyatni Martosenjoyo, M.Si. (Faculty of Engineering, Hasanuddin University, Indonesia)
Dr. Saiful, S.T., M.T. (Faculty of Engineering, Hasanuddin University, Indonesia)
Dr. Andi Sitti Chairunnisa M, S, T. M.T. (Faculty of Engineering, Hasanuddin University, Indonesia)

Editors

The original version of this paper is available on https://www.scientific.net/CTA.16.-3.pdf

Dr. Eng. Andi Amijoyo Mochtar, S.T., M.Sc.
Zarah Arwieny Hanami, S.T., M.T.
Dr. Eng. Muhammad Akbar Caronge, S.T., M.T.

Host

The original version of this paper is available on https://www.scientific.net/CTA.16.-3.pdf

Supported by：

The original version of this paper is available on https://www.scientific.net/CTA.16.-3.pdf

九州大学
KYUSHU UNIVERSITY
UTM
UNIVERSITI TEKNOLOGI MALAYSIA

Chulalongkorn University
CHUNG YUAN Christian University
VALE
PT．VALE INDONESIA Tbk