Construction Technologies and Architecture, ISSN: 2674-1237, Vol. 18, pp -7-0

© 2025 Trans Tech Publications Ltd, All Rights Reserved

Accepted:
2025-06-06

Online:
2025-06-09

Advisory Board

Prof. Dr. Ishak., M.Si

Dr. Ir. Irwansyah, S.T., M.Eng., IPM

Head of the Committee

Ir. Adib, S.T., M.T.

Editorials

Ir. Rizki Agam Syahputra, S.T., M.Si, M.AppIn&E

Dr. Ir. Jolli Supardi, S.T., M.T.

Treasurer

Ir. Sofiyanurriyanti, S.T., M.

Secretariat

Cut Mutia, S.T., M.T.

Fitry Hasdanita, S.T., M.T.

Hayatun Maghfirah, S.ST., M.T.

Conference Support

Delfian Masrura, S.T., M.T.

Ir. Mahmud Basuki, S.T., M.T.

Ana Elvia Jakfar, S.Pd., M. Ed.

Syahrul Fathi, S.T., M.T.

Tya Ulfah, S.Pd., Gr, MIE, M.T.

Roja Safitriyawi, S.T., M.T.

Suci Ayu Lestari, S.T., M.T.

Randila Tiayu Ismar, S.Pd., M.Pd.

Ir. Kasmawati, S.T., M.T.

Fajar Okta Widarta, S.Pd., M.Pd.

Ir. Inseun Yuri Salena, B.Sc., M.Sc.

Farid Jayadi, S.T., M.Eng.

Ir. Azwanda, S.T., M.Eng., IPM, ASEAN

Ir. Heri Tri Irawan, S.T., M.T.

Ir. Arrazy Elba Ridha, S.T., M.T.

Darwin Hendri, S.T.

Alvisyahri, S.T., M.T.

Ir. Risnadi Irawan, S.TP., M.T.

Masykur, S.Pd., M.T.

Rita Hartati, S.Pd., M.Pd.

Preface

The original version of this paper is available on https://www.scientific.net/CTA.18.-7.pdf

We are pleased to present the proceedings of "The 2nd International Conference on Applied Engineering, Science, Technology and Innovation (AESTI 2024)". This book consolidates the groundbreaking research contributions and insightful discussions shared during the conference.
The AESTI 2024 conference served as a vibrant platform for fostering interdisciplinary collaboration among researchers, academics, practitioners, and industry professionals worldwide. This year's theme emphasised the importance of addressing global and regional challenges through sustainable engineering practices and innovative technologies, paving the way for a more resilient and prosperous future.
The chapters in this book reflect the depth and breadth of discussions held during the conference, covering a wide array of topics:

Materials Corrosion

Building Materials

Structural Engineering and Disaster Resilience Assessment

Urban Planning and Infrastructure Development

Rural Planning and Development

Each paper underwent a meticulous peer-review process to ensure academic rigor and relevance, contributing significantly to the body of knowledge in applied engineering, science, and technology. We extend our deepest gratitude to Universitas Teuku Umar for its unwavering support and commitment to hosting this significant international event. Our heartfelt thanks also go to the contributing researchers and participants, whose dedication and contributions enriched the quality of this conference.
Additionally, we are immensely grateful to the organising committee, peer reviewers, and technical staff for their tireless efforts in ensuring the smooth execution of the conference and the preparation of this publication.
We hope this book will serve as a lasting source of knowledge and inspiration, fostering future research, innovation, and collaboration to address the challenges and opportunities of the modern world.

Editorial Committee
AESTI 2024

Conferences Committee

The original version of this paper is available on https://www.scientific.net/CTA.18.-7.pdf

Sponsors

The original version of this paper is available on https://www.scientific.net/CTA.18.-7.pdf

Universitas Teuku Umar
bersaudara

PT Mifa Bersaudara

Bank Syariah Indonesia

Persatuan Insinyur Indonesia - West Aceh

Publication Partner

The original version of this paper is available on https://www.scientific.net/CTA.18.-7.pdf

Scientific.Net
Publisher in Materials Science & Engineering