Engineering Headway, ISSN: 2813-8333, Vol. 14, pp -1-0

© 2025 Trans Tech Publications Ltd, All Rights Reserved

Accepted:
2024-11-05

Online:
2025-01-14

Committee

The original version of this paper is available on https://www.scientific.net/EH.14.-1.pdf

Prof. Dr. Sayekti Wahyuningsih

Dr. Ahmad Marzuki

Prof. Ari Handono Ramelan

Prof. Venty Suryanti

Dr. Eng. Risa Suryana

Preface

The original version of this paper is available on https://www.scientific.net/EH.14.-1.pdf

With this publication, I am pleased to introduce you to the collection of articles that were presented at the 8th International Conference on Advanced Material for Better Future (ICAMBF 2023) held on October 19, 2023, in Surakarta, Indonesia.

ICAMBF aims to create an international forum for academics, researchers and scientists from all over the world to discuss and share their research results, proposals, new ideas and new technologies in the area of materials and nanomaterials through interactive discussions and technical sessions at the event.

This edition focuses on research results on bioconversion processes and properties of some materials for pharmacological and biomedical applications and will be useful to specialists in the fields of bioresources use, biomedicine and pharmacology.

On behalf of the organizing committee, I would like to acknowledge the technical comments from the reviewers and thank all the authors for their contributions to the meeting and the overall success of the conference.

Warmest regards, Conference Organizing Chair
Prof. Dr. Sayekti Wahyuningsih
Universitas Sebelas Maret, Surakarta, Indonesia