Engineering Headway, ISSN: 2813-8333, Vol. 29, pp -1-0

© 2025 Trans Tech Publications Ltd, All Rights Reserved

Accepted:
2025-11-11

Online:
2025-11-14

Preface

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

The International Conference on Sciences, Nano, and Healthcare Technology (ICOSNHT2024), held under the auspices of the Faculty of Medicine and Health in collaboration with the Research Centre for Fundamental Sciences, Advanced Materials and Nanotechnology, and Internet of Things-Defense Technology (IoTTP) at the Institut Teknologi Sepuluh Nopember (ITS) brought together researchers, academics, professionals, and industry practitioners to share their latest innovations and research findings in the fields of fundamental sciences, nanotechnology, biomedical applications, and digital technologies for healthcare.

The papers reflect the diversity and interdisciplinarity of the topics discussed, ranging from the synthesis of novel nanomaterials and biomaterials to the integration of smart technologies and artificial intelligence in health monitoring and diagnostics. We believe these contributions will inspire further research and collaboration across disciplines in pursuit of sustainable and innovative healthcare solutions.

On behalf of the organizing committee, we extend our deepest gratitude to all authors, reviewers, and participants who have contributed to the success of ICOSNHT-2024.

Organizing Committee

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Chairman
Dr. Eng. Dhany Arifianto, S.T., M.Sc.
Dept. of Medical Technology, ITS
Vice Chairman
Prof. Dra. Ratna Ediati. M.Sc., Ph.D.
Dept. of Chemistry, ITS
Dr. Ir. Adhi Dharma Wibawa, S.T., M.T.
Dept. of Medical Technology, ITS

Secretary

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Fahmi Mubarok, S.T., M.Sc., Ph.D.
Dept. of Mechanical Engineering, ITS
Secretariat
Dr. Widyastuti, S.Si., M.Si.
Dept. of Materials and metallurgical Engineering, ITS
Event and Sponsorship
Muhammad Ammar Asyraf, S.T., M.T. IoTTP, ITS
Media
Nofa Argaka Iftitachur Rizqi, A.Md.T.
SF, ITS
Achmad Fadjar Maulana Firdaus
Materials and Metallurgical Engineering,ITS

Treasurer

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Dr. Lila Yuwana, S.Si., M.Si.

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Dept. of Physics, ITS

Publication

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Retno Asih, S.Si., M.Si., Ph.D.

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Dept. of Physics, ITS
Dr. Edwin Nughroho Njoto, Sp. PD.
Dept. of Medical Technology, ITS
Yuri Pamungkas, S.T., M.T.
Dept. of Medical Technology, ITS

Documentation

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Ninik Safrida, S.T.

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

IoTTP, ITS
Ismawati Putri, S.Si.
MNT, ITS
Aqsyal Syahroni
Dept. of Materials and metallurgical Engineering, ITS

Technical Committee

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Dr. Wiwin Retnowati, M.Kes., S.Si.

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Dept of Medical Microbiology, Airlangga University Prof. Dr. Nyilo Purnami, dr., Sp.T.H.T.B.K.L., Subsp.N.O.(K)., FICS., FISCM
Medical Faculty, Airlangga University

Ir. Sentagi Sesotya Utami, S.T., M.T., Ph.D.

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Dept. of Engineering Physics, Gajah Mada University

Prof. Trio Adiono, S.T., M.T., Ph.D.

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

Dept. Electrical Engineering, ITB
Anugrah Sabdono Sudarsono, S.T., M.T., Ph.D
Faculty of Industrial Engineering, ITB
Dr Yudan Whulanza, S.T, M.Sc.
Dept of Mechanical Engineering, University of Indonesia

Sponsors

The original version of this paper is available on https://www.scientific.net/EH.29.-1.pdf

The International Conference on Sciences, Nano, and Healthcare Technology (ICOSNHT2024) gratefully acknowledges the support from:

Institut Teknologi Sepuluh Nopember (ITS) through the International Seminar Grant Program 2024 (Dana Bantuan Penyelenggaraan Seminar Internasional Tahun 2024).

We extend our sincere appreciation to ITS for its continued commitment to advancing global research collaboration and fostering scientific innovation through international academic events.