Engineering Headway, ISSN: 2813-8333, Vols. Engineering Headway Vol. 5, pp -7-0

© 2024 Trans Tech Publications Ltd, All Rights Reserved

Accepted:
2024-02-27

Online:
2024-04-03

Dr. S. Harikrishnan

Principal,

Pallavan College of Engineering, Tamilnadu, India

Preface

The original version of this paper is available on https://localhost:44305/EH.5.-7.pdf

This issue features articles that showcase research findings presented at the International Conference on Functional Materials for Energy and Manufacturing (ICFMEM 2023), which was held on July 26, 2023, at Pallavan College of Engineering in Kancheepuram, Tamilnadu, India. ICFMEM provided a platform for experts, researchers, scholars, and academicians across the globe to exhibit their recent innovative research results and the most recent trends in the diverse fields of materials and energy.

The program was comprised of three Plenary and four Invited lectures and eighty oral presentations covering emerging fields of materials and energy. The organizing committee sincerely acknowledges the support and continuous encouragement from Shri. E. Santhanam, Smt. S. Selvambal (Patrons-RBRI), Dr. P. Anandhi (Conference Chair) and Dr. Kamrul Hasan Talukder (Conference Secretary), Khulna University, Bangladesh.

Also, we would like to express thanks to Professor Dr. Ilhami Colak, Nisantasi University, Turkey, for rendering his support. We are grateful to the advisory committee and technical review committee (National/International) for their valuable suggestions and contributions in organizing the impressive scientific event.

The organizers sincerely thank the guest editors and all the reviewers for their great efforts in bringing out the high-standard scientific publication. The organizers of the conference also extend their gratitude to the publisher Scientific.net for support in the publication of this issue.

Committee

The original version of this paper is available on https://localhost:44305/EH.5.-7.pdf

Organizing Secretary

The original version of this paper is available on https://localhost:44305/EH.5.-7.pdf

Dr. Kamrul Hasan Talukder, Prof & Dean, SETS, Khulna University, Bangladesh

Conference Chair

The original version of this paper is available on https://localhost:44305/EH.5.-7.pdf

Dr. P. Anandhi, Ranbal Research Institute, Kancheepuram, India

Advisory Committee

The original version of this paper is available on https://localhost:44305/EH.5.-7.pdf

Dr. Md. Rezaul Haque, Professor, Khulna University, Bangladesh
Dr. Farzana Nahid, Professor, Khulna University, Bangladesh
Dr. Md. Haider Ali Biswas, Professor, Khulna University, Bangladesh
Dr. Md. Shamim Ahsan, Professor, Khulna University, Bangladesh
Dr. S. Harikrishnan, Principal, Pallavan College of Engineering, Kanchipuram, India
Dr. R. Thangappan, Periyar University, Salem, India
Dr. G. Murugadoss, Sathyabama University, Chennai, India
Dr. S. Sankar, Sriram Engineering College, Chennai, India
Dr. R. Vinayagamoorthy, SCSVMV University, Kancheepuram, India
Dr. D.S. Vijayan, AVIT, Chennai, India
Dr. A. Rajaram, EGS Pillay Engineering College, Nagapattinam, India
Dr. K. Anisha, SCSVMV University, Kancheepuram, India
Dr. G. Chinnadurai, Rajiv Gandhi College of Engg, Chennai, India
Dr. S. Imran Ussain, Saveetha Engineering College, Chennai, India
Dr. B. Senthil, SRM Institute of Science & Technology, Chennai, India
Dr. G. Sriharan, AVC College of Engineering, Tamilnadu, India
Prof. M. Seeman, Annamalai University, Tamilnadu, India
Dr. P. Sivaraj, Annamalai University, Tamilnadu, India
Dr. Muthumanickam, Institution of Textile Technology, Chennai, India
Dr. R. Selvam, Saveetha Engineering College, Chennai, India
Dr. L. Prabhu, Aarupadai Veedu Institute of Tech, Chennai, India
Dr. M. Prabahar, Aarupadai Veedu Institute of Tech, Chennai, India
Er. P. Vignesh, Project Engineer, EinNel Technologies

Advisory Committee (International Members)

The original version of this paper is available on https://localhost:44305/EH.5.-7.pdf

Dr. Vincenzo Bianco, Universita degli Studi di Genova, Italy
Dr. Mohammed Hafiz Ali, University of Texas, USA
Dr. Muhammed Bin Mat Noor, Universiti Malaysia, Pahang
Dr. Nidal AbuHamdeh, King Abdulaziz University, Saudi Arabia
Dr. Tarek Bouktir, University of Ferhat Abbas Setif, Algeria
Dr. Evangelos Bellos, National Technical University of Athens, Greece
Dr. Hamzah Ahmad, Universiti Malaysia, Pahang
Dr. Tooraj Yousefi, Ryerson University, Canada
Dr. Hakan F Oztop, Firat University, Turkey
Dr. Robert A Taylor, University of New South Wales, Australia
Dr. M. Shanmugam, Yeungnam University, South Korea

Dr. Luis Lugo, Universidade de Vigo, Spain
Dr. Ayodele A Daniyan, Obafemi Awolowo University, Nigeria
Dr. D. Jegan Raj, Wolkite University, Ethiopia
Dr. Aloysius F. Hepp, Chief Technologist Nanotech Innovations, USA
Dr. Jaime C. Galvez, Universidad Politecnica de Madrid, Madrid, Spain
Dr. Nader Karimi, Queen Mary University of London, England
Dr. Muhammad Sharif, The University of Alabama, USA
Dr. Azura Che Soh, Universiti Putra Malaysia, Malaysia
Dr. Mazin Zeki Othman, Dhofar University, Oman
Dr. Isaac I. Akinwumi, Covenant University, Nigeria
Dr. Balew Baye, Debre Tabor University, Ethiopia
Dr. Alaa El Din Mahmoud, Environmental Sciences Department, Faculty of Science, Alexandria University, Egypt.
Dr. Benlekkam Mohamed Lamine, Smart Structure Laboratory, University Center d'Ain Temouchent, Algeria

Technical Review Committee

The original version of this paper is available on https://localhost:44305/EH.5.-7.pdf

Dr. Abu Shamim Mohammad Arif, Professor, Khulna University, Bangladesh
Dr. Munnujahan Ara, Professor, Khulna University, Bangladesh
Dr. Md. Rashedur Rahman, Professor, Khulna University, Bangladesh
Dr. Pradip Lingfa, NERIST, Arunachel Pradesh, India
Dr. John Philip, IGCAR, India
Dr. K.M. Pandey, NIT Silchar, India
Dr. A. Arivarasan, Kalasalingam University, Krishnankovil, India
Dr. R. Prakash, VIT University, Vellore, Tamilnadu, India
Dr. D. Dineshkumar, Sathyabama University, India
Dr. B. Raja, IIIT&DM, Kancheepuram, Chennai, India
Dr. A. Rajasekhar, SRM Institute of Science & Technology, India
Dr. A.D. Dhass, Indus Institute of Technology and Engineering, Indus University, Gujarat, India
Dr. R. K. Sharma, Manipal University, Jaipur, India

Publication Committee

The original version of this paper is available on https://localhost:44305/EH.5.-7.pdf

Prof. Viacheslav Barsukov, Kyiv National University of Technologies and Design, Ukraine
Dr. Md. Shamim Ahsan, Professor, Khulna University, Bangladesh
Dr. Jamil Ahmed, Associate Professor, Khulna University, Bangladesh
Dr. Md. Omar Faruk Rasel, Associate Professor, Khulna University, Bangladesh
Dr. V. Jawahar Senthilkumar, Anna University, Chennai, India

Conference Photos

The original version of this paper is available on https://localhost:44305/EH.5.-7.pdf