Journal of Biomimetics, Biomaterials and Biomedical Engineering, ISSN: 2296-9845, Vol. 55, pp -5-0

© 2022 Trans Tech Publications Ltd, All Rights Reserved

Accepted:
2022-02-07

Online:
2022-03-28

Preface

The original version of this paper is available on https://www.scientific.net/JBBBE.55.-5.pdf

This special issue of the "Journal of Biomimetics, Biomaterials and Biomedical Engineering" highlights actual topics in biomedical engineering and health informatics. The themes were chosen because of the current revolutionary growth and development in electronics, communication, methods of signal and image processing, and biomedicine in general.

This volume will be attractive for many researchers in biomedical engineering and become a beneficial source in future research.

Associate Professor Dr. Triwiyanto
Guest Editor